0 10 20 30 40 50 60 70 80 90 100 0

0.5

Level [m]

0 10 20 30 40 50 60 70 80 90 100 time [s] 0

0.5

1

Inflow [m^3/s]

0 10 20 30 40 50 60 70 80 90 100 time [s] 0

0.5

1

Outflow [m^3/s] q_{out,max} q_{out,mid} q_{out,min}

q_{out}