0 1 2 3 4 5 6 7 8 9 10 0

0.2

0.4

0.6

0.8

1

1.2

T ime, t

Output,y

SIMC-P I (original, =_I = 0)

IMC-P I (=_I = 0:5)

SIMC-P I (improved, =_I = 0:33)