1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3 25

30

35

40

45

50

55

60

65

Robust ness, M_s

Phasemargin,PM

=_1 = 0 =_1 = 1 =_1 = 8 =_1 = 1