0 5 10 15 20 25 30 35 40 45 50 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

P rocess t ime const ant , =_1=3

Controlergain,Kck3=1

M_s = 2:00

M_s = 1:70 M_s = 1:59 M_s = 1:50

M_s = 1:20