0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0

0.5 Flow 1

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0

0.5 Flow 2

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

0.999 1 1.001

Total flow

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

97.5 98 98.5

Octane

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

0.04

0.06

0.08

Profit