-100

-50

0

Magnitude (dB)

10^{-2} 10^0 10^2

-180 0 180 360 540

Phase (deg)

S T

Bode Diagram Gm = Inf , Pm = 135 deg (at 1.34 rad/sec)

Frequency (rad/sec)