\chapter{Calculation of heat capacities}
\label{app:heatCapacity}
The equation and parameters used to calculate the heat capacity of a specific component are listed in this appendix. They are all obtained from the literature. \cite{PolingBruceE2001Tpog}

\begin{equation}
\label{eq:CpFormulaBook:app}
    \frac{Cp}{R} = a + b \cdot 10^{-3} \cdot T + c \cdot 10^{-5} \cdot T^2 + d \cdot 10^{-8} \cdot T^3 + e \cdot 10^{-11} \cdot T^4
\end{equation}


\begin{table}[H]
\caption{Parameters used with Equation \ref{eq:CpFormulaBook:app}.}
\label{tab:CpParameters:app}
\centering
\begin{tabular}{l r r r r r} 
 \hline
 \textbf{Component} & \textbf{\textit{a}} & \textbf{\textit{b}} & \textbf{\textit{c}} & \textbf{\textit{d}} & \textbf{\textit{e}} \\
 \hline \\ [-1.8ex]
 \ce{Ar} & 2.500 & 0.000 & 0.000 & 0.000 & 0.000  \\
 \ce{CO_2} & 3.259 & 1.356 & 1.502 & -2.374 & 1.056  \\
 \ce{H_2O} & 4.395 & -4.186 & 1.405 & -1.564 & 0.632  \\
 \ce{N_2} & 3.539 & -0.261 & 0.007 & 0.157 & -0.099  \\
 \ce{O_2} & 3.630 & -1.794 & 0.658 & -0.601 & 0.179  \\  [0.5ex] 
 \hline
\end{tabular}
\end{table}
