$trend 200 4 200 16 200 64 200 256 
$alarms 0 0 0 0 0 2.5e+006 1000 2000000 100 
$logging mins 1 0 0 0 200
hours 4 0 0 0 200
days 16 0 0 0 200
weeks 64 0 0 0 200
months 256 0 0 0 200
$snap 0 3600 30 1 1 ASCII WITHOUT_TRENDS MCL ERASE_SNAPS
$sounds "action=StopSound;" "action=PlaySound,%_SET_SOUND" ",repeat;"

$dcs_defs = [ LookAhead_dcs="0" alarm_delay="5" alarms="OFF" auto_save="OFF" dcs_enable="1" deadband_def="0" max_speed="100000" op_mode="1" read_delay="0" upd_max_cnt="0" ]  
$dcs_cmd_prop = [ def_react="0" file_tmo="0" loc_tmo="0" report_lev="0" step_tmo="0" ]  

$dcs_driver "OPC" "dspice_opc" attr = [ ForwardOutputs="1" OTS_plugin="" allow_tag_resize="0" browse_machine="" connect_cyc="10" da_ProgId="Fantoft.DSPICEOPCServer.DA.1" da_clsid="{7CF26890-D2CD-47E9-AD57-729898FC8328}" da_prog_desc="D-SPICE OPC DA Server" init_dcs_out="1" io_conn_cyclic="0" io_mode="0" machine_name="localhost" mdl_time_ident="dspice.model.time" mdl_time_send="1" ots_conn_cyclic="0" owner="master" serial_step="0" unit_update="0" ]  

$DCS_conf_file "c:\Fantoft\Karsto_DPS\dspice\model\dcs\Master_OPCserver.dcs"

